ALTER TABLE diak MODIFY `viseltNevElotag` varchar(8) COLLATE utf8_hungarian_ci NULL DEFAULT '';
ALTER TABLE diak MODIFY `szuleteskoriNevElotag` varchar(8) COLLATE utf8_hungarian_ci NULL DEFAULT '';